Summary Page Created:Thu February 16, 2006 12:48 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590380

Instrument: ACIS Obs ID: 6053 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06053N002 full img2.fits acisf06053N002 cntr img2.fits

Summary Page Created:Thu February 16, 2006 12:48 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590380

Instrument: ACIS Obs ID: 6053 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T17:27:29 Date and time of file creation DATE-OBS 2005-01-12T09:52:17 Observation start date DATE-END 2005-01-12T12:05:47 Observation end date RA PNT 15.757538471423 Pointing RA DEC PNT -72.101878928315 Pointing Dec ROLL PNT 269.34179703461 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T17:47:23 Date and time of file creation DATE-OBS 2005-01-12T09:52:17 Observation start date DATE-END 2005-01-12T12:05:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,4.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6053 Observation id SEQ NUM 590380 Sequence number RA NOM 15.757538471423 Nominal RA DEC NOM -72.101878928315 Nominal Dec ROLL NOM 269.34179703461 Nominal Roll

Summary Page Created:Thu February 16, 2006 12:48 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590380

Instrument: ACIS Obs ID: 6053 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.020071 -72.032794 985.397522 58.974308 16.708929 15.999374 -72.028908 899.922485 61.988457 14.517582 16.008439 -72.027154 808.247498 58.649033 13.781089 15.906411 -72.025915 186.875000 15.123789 12.356361 16.004402 -72.034503 695.056824 57.210537 12.149105 15.808121 -72.153974 177.715912 15.148600 11.731507 15.997074 -72.031227 603.818176 53.433735 11.300318 16.020118 -72.028992 555.979980 52.622211 10.565500 15.406326 -72.071994 142.565002 14.609241 9.758550 15.336650 -72.188619 90.974998 12.094460 7.522039