Summary Page Created:Thu February 16, 2006 12:52 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590381

Instrument: ACIS Obs ID: 6054 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06054N002 full img2.fits acisf06054N002 cntr img2.fits

Summary Page Created:Thu February 16, 2006 12:52 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590381

Instrument: ACIS Obs ID: 6054 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T17:30:55 Date and time of file creation DATE-OBS 2005-01-12T12:05:47 Observation start date DATE-END 2005-01-12T14:28:51 Observation end date RA PNT 15.648833296424 Pointing RA DEC PNT -72.101147726175 Pointing Dec ROLL PNT 269.13622963627 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-16T17:51:14 Date and time of file creation DATE-OBS 2005-01-12T12:05:47 Observation start date DATE-END 2005-01-12T14:28:51 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,6.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6054 Observation id SEQ NUM 590381 Sequence number RA NOM 15.648833296424 Nominal RA DEC NOM -72.101147726175 Nominal Dec ROLL NOM 269.13622963627 Nominal Roll

Summary Page Created:Thu February 16, 2006 12:52 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590381

Instrument: ACIS Obs ID: 6054 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019220 -72.033490 1216.083374 64.022179 18.994720 16.003226 -72.034273 1146.556763 69.046974 16.605461 16.011120 -72.027275 1038.666626 65.216225 15.926508 15.906533 -72.025980 279.179993 18.514252 15.079194 15.179018 -72.192765 244.103455 17.813799 13.703053 16.019033 -72.028513 770.625000 57.913906 13.306390 15.808102 -72.153977 206.000000 16.425438 12.541523 15.406261 -72.071978 169.857147 15.663458 10.844167 15.336412 -72.188628 112.416664 13.295854 8.455017 15.336946 -72.188556 96.670456 12.904934 7.490969