Summary Page Created:Sat April 8, 2006 18:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590382

Instrument: ACIS Obs ID: 6055 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06055N002 full img2.fits acisf06055N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 18:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590382

Instrument: ACIS Obs ID: 6055 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T21:29:44 Date and time of file creation DATE-OBS 2004-12-16T23:58:36 Observation start date DATE-END 2004-12-17T02:59:09 Observation end date RA PNT 16.168109080245 Pointing RA DEC PNT -71.92375305464 Pointing Dec ROLL PNT 297.39250530647 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T22:00:29 Date and time of file creation DATE-OBS 2004-12-16T23:58:36 Observation start date DATE-END 2004-12-17T02:59:09 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I0,-120,4.7,-5.68,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6055 Observation id SEQ NUM 590382 Sequence number RA NOM 16.168109080245 Nominal RA DEC NOM -71.92375305464 Nominal Dec ROLL NOM 297.39250530647 Nominal Roll

Summary Page Created:Sat April 8, 2006 18:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590382

Instrument: ACIS Obs ID: 6055 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019012 -72.033066 1379.103394 64.581436 21.354486 15.906554 -72.025927 343.333344 20.685225 16.598000 16.005124 -72.027601 1031.372437 66.949730 15.405176 15.999039 -72.028787 947.310364 63.912899 14.821896 16.018935 -72.028682 845.275879 58.160255 14.533566 16.001668 -72.034110 1013.593079 71.519218 14.172318 16.001376 -72.034929 841.318176 64.290382 13.086221 16.879300 -71.693699 203.119598 28.427212 7.145252 15.906764 -72.025438 122.909088 19.293320 6.370552 16.343990 -71.947172 31.079546 7.054573 4.405589