Summary Page Created:Sat April 8, 2006 18:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590383

Instrument: ACIS Obs ID: 6056 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06056N002 full img2.fits acisf06056N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 18:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590383

Instrument: ACIS Obs ID: 6056 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T21:41:39 Date and time of file creation DATE-OBS 2004-12-17T07:23:55 Observation start date DATE-END 2004-12-17T10:12:37 Observation end date RA PNT 16.28633483939 Pointing RA DEC PNT -72.068392186043 Pointing Dec ROLL PNT 297.17286134161 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T22:08:09 Date and time of file creation DATE-OBS 2004-12-17T07:23:55 Observation start date DATE-END 2004-12-17T10:12:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I1,-120,-4.0,-3.68,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6056 Observation id SEQ NUM 590383 Sequence number RA NOM 16.28633483939 Nominal RA DEC NOM -72.068392186043 Nominal Dec ROLL NOM 297.17286134161 Nominal Roll

Summary Page Created:Sat April 8, 2006 18:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590383

Instrument: ACIS Obs ID: 6056 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.002209 -72.034495 948.181824 61.888851 15.320721 15.999822 -72.028199 764.806824 52.401653 14.595090 15.906557 -72.025828 245.954544 17.565853 14.001857 16.019624 -72.033265 669.875000 50.029232 13.389672 16.015772 -72.034632 649.291687 50.124805 12.953501 15.997013 -72.031260 710.136353 55.953835 12.691469 16.009844 -72.027144 582.045471 52.191479 11.152116 16.008851 -72.031978 215.041672 37.303391 5.764668 17.012378 -71.835276 140.592422 25.398090 5.535551 16.290671 -72.196274 46.318180 8.634954 5.364033