Summary Page Created:Sat April 8, 2006 07:04 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590384

Instrument: ACIS Obs ID: 6057 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

acisf06057N002 full img2.fits acisf06057N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 07:04 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590384

Instrument: ACIS Obs ID: 6057 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T10:50:04 Date and time of file creation DATE-OBS 2004-12-17T22:49:46 Observation start date DATE-END 2004-12-18T01:23:42 Observation end date RA PNT 15.778265120033 Pointing RA DEC PNT -71.984440570599 Pointing Dec ROLL PNT 296.09377169858 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T11:03:15 Date and time of file creation DATE-OBS 2004-12-17T22:49:46 Observation start date DATE-END 2004-12-18T01:23:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I2,-120,4.7,2.5,0] Source name TITLE AO6A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6057 Observation id SEQ NUM 590384 Sequence number RA NOM 15.778265120033 Nominal RA DEC NOM -71.984440570599 Nominal Dec ROLL NOM 296.09377169858 Nominal Roll

Summary Page Created:Sat April 8, 2006 07:04 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590384

Instrument: ACIS Obs ID: 6057 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO6A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019609 -72.032794 771.750000 52.646385 14.659126 16.004009 -72.034747 741.250000 55.037487 13.468094 15.906545 -72.025832 188.034088 15.775528 11.919353 16.001740 -72.028065 597.041687 53.290524 11.203524 16.015236 -72.034737 515.500000 49.161198 10.485912 15.997331 -72.030747 507.083344 51.893631 9.771591 15.405883 -72.072084 126.193184 13.652603 9.243159 16.010399 -72.026772 410.833344 46.191746 8.894085 16.021216 -72.029368 354.000000 43.681313 8.104152 16.008435 -72.031474 253.333328 36.185982 7.000870