Summary Page Created:Fri March 10, 2006 03:24 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590387

Instrument: ACIS Obs ID: 6060 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6B ACIS-I Calibration Observations of E0102-72

acisf06060N002 full img2.fits acisf06060N002 cntr img2.fits

Summary Page Created:Fri March 10, 2006 03:24 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590387

Instrument: ACIS Obs ID: 6060 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-10T07:47:38 Date and time of file creation DATE-OBS 2005-06-13T13:10:43 Observation start date DATE-END 2005-06-13T19:14:36 Observation end date RA PNT 16.018338695145 Pointing RA DEC PNT -72.016078046521 Pointing Dec ROLL PNT 119.93660279521 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-03-10T08:23:07 Date and time of file creation DATE-OBS 2005-06-13T13:10:43 Observation start date DATE-END 2005-06-13T19:14:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-0.5,0.5,0] Source name TITLE AO6B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6060 Observation id SEQ NUM 590387 Sequence number RA NOM 16.018338695145 Nominal RA DEC NOM -72.016078046521 Nominal Dec ROLL NOM 119.93660279521 Nominal Roll

Summary Page Created:Fri March 10, 2006 03:24 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590387

Instrument: ACIS Obs ID: 6060 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO6B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906569 -72.025930 1017.714294 33.822887 30.089514 15.184400 -72.190937 1307.345459 65.985039 19.812757 15.807526 -72.153826 452.157501 25.535374 17.707104 15.406445 -72.072158 371.875000 26.570822 13.995615 15.317908 -72.254790 582.780579 57.479275 10.138968 16.015706 -72.034904 454.000000 48.556770 9.349880 15.123875 -72.151505 488.803986 53.041763 9.215455 15.998942 -72.028384 441.142853 48.294502 9.134432 16.017612 -72.033876 400.714294 48.241913 8.306352 16.002481 -72.034900 383.428558 47.866756 8.010331