Summary Page Created:Tue February 28, 2006 16:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590394

Instrument: ACIS Obs ID: 6067 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

acisf06067N002 full img2.fits acisf06067N002 cntr img2.fits

Summary Page Created:Tue February 28, 2006 16:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590394

Instrument: ACIS Obs ID: 6067 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T20:41:06 Date and time of file creation DATE-OBS 2005-04-12T07:40:24 Observation start date DATE-END 2005-04-12T08:43:52 Observation end date RA PNT 351.01095336474 Pointing RA DEC PNT 58.799232794128 Pointing Dec ROLL PNT 36.974659940035 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-28T21:02:05 Date and time of file creation DATE-OBS 2005-04-12T07:40:24 Observation start date DATE-END 2005-04-12T08:43:52 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Cas A[I3,-120,-3.0,3.5,0] Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6067 Observation id SEQ NUM 590394 Sequence number RA NOM 351.01095336474 Nominal RA DEC NOM 58.799232794128 Nominal Dec ROLL NOM 36.974659940035 Nominal Roll

Summary Page Created:Tue February 28, 2006 16:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590394

Instrument: ACIS Obs ID: 6067 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.849117 58.840217 926.897705 59.214516 15.653218 350.881296 58.796372 518.857117 35.457436 14.633240 350.870447 58.828695 336.142853 28.326511 11.866723 350.830309 58.842529 609.840881 52.636364 11.585924 350.822489 58.793170 402.238647 35.793861 11.237643 350.896959 58.834718 508.000000 48.689697 10.433419 350.887376 58.796718 372.715912 37.728077 9.879006 350.848467 58.805886 249.958328 26.126917 9.567081 350.798531 58.804886 509.112488 53.674053 9.485263 350.885908 58.796675 318.488647 33.968918 9.375884