Summary Page Created:Sat November 24, 2007 09:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590396

Instrument: HRC Obs ID: 6069 Source: Cas A PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

hrcf06069N003 full img2.fits hrcf06069N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 09:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590396

Instrument: HRC Obs ID: 6069 Source: Cas A PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T13:56:45 Date and time of file creation DATE-OBS 2005-04-12T09:47:26 Observation start date DATE-END 2005-04-12T11:31:43 Observation end date RA PNT 350.86573496151 Pointing RA DEC PNT 58.815924832707 Pointing Dec ROLL PNT 36.955583588521 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T14:13:53 Date and time of file creation DATE-OBS 2005-04-12T09:47:26 Observation start date DATE-END 2005-04-12T11:31:43 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Cas A Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6069 Observation id SEQ NUM 590396 Sequence number RA NOM 350.86573496151 Nominal RA DEC NOM 58.815924832707 Nominal Dec ROLL NOM 36.955583588521 Nominal Roll

Summary Page Created:Sat November 24, 2007 09:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590396

Instrument: HRC Obs ID: 6069 Source: Cas A PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.866426 58.811779 150.458328 14.678994 10.249907 350.853017 58.840717 282.011353 27.907049 10.105381 350.836916 58.841358 219.079544 27.594259 7.939316 350.871293 58.840788 180.318176 23.701450 7.607896 350.848369 58.840112 243.920456 33.311321 7.322449 350.886250 58.796711 185.666672 27.188490 6.828870 350.922166 58.812183 153.068176 23.965950 6.386902 350.870218 58.828730 126.708336 20.053894 6.318390 350.847631 58.840278 172.829544 27.458664 6.294172 350.881564 58.796322 155.416672 24.751915 6.278975