Summary Page Created:Sat February 25, 2006 04:20 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590397

Instrument: ACIS Obs ID: 6070 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

acisf06070N002 full img2.fits acisf06070N002 cntr img2.fits

Summary Page Created:Sat February 25, 2006 04:20 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590397

Instrument: ACIS Obs ID: 6070 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T08:41:28 Date and time of file creation DATE-OBS 2005-02-26T06:17:51 Observation start date DATE-END 2005-02-26T09:09:56 Observation end date RA PNT 278.43698332311 Pointing RA DEC PNT -10.52577101077 Pointing Dec ROLL PNT 86.174653016031 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T09:19:14 Date and time of file creation DATE-OBS 2005-02-26T06:17:51 Observation start date DATE-END 2005-02-26T09:09:56 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-09[I3,-120,-2.5,2.5,0] Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6070 Observation id SEQ NUM 590397 Sequence number RA NOM 278.43698332311 Nominal RA DEC NOM -10.52577101077 Nominal Dec ROLL NOM 86.174653016031 Nominal Roll

Summary Page Created:Sat February 25, 2006 04:20 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590397

Instrument: ACIS Obs ID: 6070 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389803 -10.568771 1374.750000 54.382351 25.279341 278.368003 -10.402514 136.511368 14.343649 9.517199 278.119329 -10.603711 236.801193 29.936605 7.910088 278.124127 -10.519235 148.910294 29.161482 5.106403 278.123719 -10.532122 152.617935 30.411476 5.018433 278.385260 -10.570065 129.571426 26.902884 4.816266 278.137283 -10.609252 133.980072 28.314997 4.731771 278.123716 -10.558174 134.554825 31.134998 4.321658 278.365732 -10.590010 31.318182 7.567885 4.138300 278.216770 -10.486553 60.310505 15.038571 4.010388