Summary Page Created:Sat November 24, 2007 02:45 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590399

Instrument: HRC Obs ID: 6072 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

hrcf06072N003 full img2.fits hrcf06072N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 02:45 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590399

Instrument: HRC Obs ID: 6072 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T07:08:42 Date and time of file creation DATE-OBS 2005-02-26T12:21:58 Observation start date DATE-END 2005-02-26T17:53:34 Observation end date RA PNT 278.39147290971 Pointing RA DEC PNT -10.564917729905 Pointing Dec ROLL PNT 85.947672614844 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T07:44:21 Date and time of file creation DATE-OBS 2005-02-26T12:21:58 Observation start date DATE-END 2005-02-26T17:53:34 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-09 Source name TITLE AO6A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6072 Observation id SEQ NUM 590399 Sequence number RA NOM 278.39147290971 Nominal RA DEC NOM -10.564917729905 Nominal Dec ROLL NOM 85.947672614844 Nominal Roll

Summary Page Created:Sat November 24, 2007 02:45 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590399

Instrument: HRC Obs ID: 6072 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO6A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.723132 -10.616395 293.764618 49.555576 5.927983 278.638914 -10.470782 193.763199 33.406574 5.800152 278.648348 -10.680086 186.795456 35.108906 5.320458 278.334784 -10.880391 232.551498 45.883869 5.068263 278.389798 -10.568745 132.125000 27.680296 4.773251 278.491157 -10.302453 174.250000 36.580826 4.763424 278.345651 -10.891492 228.798538 48.812683 4.687276 278.682285 -10.518845 172.958328 37.489220 4.613549 278.096973 -10.494537 163.413391 37.477180 4.360344 278.473760 -10.284674 164.916672 38.110336 4.327347