Summary Page Created:Sat April 8, 2006 18:14 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590401

Instrument: ACIS Obs ID: 6074 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06074N002 full img2.fits acisf06074N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 18:14 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590401

Instrument: ACIS Obs ID: 6074 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T21:38:41 Date and time of file creation DATE-OBS 2004-12-16T18:04:53 Observation start date DATE-END 2004-12-16T23:58:36 Observation end date RA PNT 16.035868628224 Pointing RA DEC PNT -72.051184653879 Pointing Dec ROLL PNT 297.4393922424 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T22:13:07 Date and time of file creation DATE-OBS 2004-12-16T18:04:53 Observation start date DATE-END 2004-12-16T23:58:36 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,1,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6074 Observation id SEQ NUM 590401 Sequence number RA NOM 16.035868628224 Nominal RA DEC NOM -72.051184653879 Nominal Dec ROLL NOM 297.4393922424 Nominal Roll

Summary Page Created:Sat April 8, 2006 18:14 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590401

Instrument: ACIS Obs ID: 6074 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906400 -72.025914 871.704529 31.704138 27.494978 16.015544 -72.034787 1002.142883 71.463524 14.023137 16.002333 -72.034780 928.000000 70.421753 13.177746 16.018079 -72.033697 941.142883 72.928787 12.904957 16.019012 -72.032866 892.857117 75.174362 11.877150 16.003907 -72.034784 884.142883 75.374870 11.729942 16.008514 -72.032076 574.714294 49.203674 11.680312 16.020013 -72.031517 654.142883 62.851223 10.407799 16.012866 -72.035316 625.857117 63.148697 9.910848 15.996884 -72.031240 646.142883 67.014481 9.641839