Summary Page Created:Sat April 8, 2006 06:58 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590402

Instrument: ACIS Obs ID: 6075 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06075N002 full img2.fits acisf06075N002 cntr img2.fits

Summary Page Created:Sat April 8, 2006 06:58 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590402

Instrument: ACIS Obs ID: 6075 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T10:44:38 Date and time of file creation DATE-OBS 2004-12-18T01:23:42 Observation start date DATE-END 2004-12-18T04:15:52 Observation end date RA PNT 15.9871438281 Pointing RA DEC PNT -72.021410706924 Pointing Dec ROLL PNT 296.11211336691 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-08T10:57:14 Date and time of file creation DATE-OBS 2004-12-18T01:23:42 Observation start date DATE-END 2004-12-18T04:15:52 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6075 Observation id SEQ NUM 590402 Sequence number RA NOM 15.9871438281 Nominal RA DEC NOM -72.021410706924 Nominal Dec ROLL NOM 296.11211336691 Nominal Roll

Summary Page Created:Sat April 8, 2006 06:58 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590402

Instrument: ACIS Obs ID: 6075 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906464 -72.025908 268.857147 18.044716 14.899494 16.015576 -72.034787 392.571442 44.606052 8.800856 16.002372 -72.034797 386.142853 44.941097 8.592199 16.003891 -72.034790 390.000000 47.650715 8.184557 16.018099 -72.033694 370.857147 46.207180 8.025964 15.998759 -72.028287 324.571442 40.510773 8.011978 16.002195 -72.028253 304.000000 42.647888 7.128137 15.996916 -72.031268 280.000000 42.356113 6.610616 16.008564 -72.032090 191.142853 29.117413 6.564555 16.020069 -72.031273 253.857147 38.735126 6.553668