Summary Page Created:Fri April 7, 2006 04:02 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590403

Instrument: ACIS Obs ID: 6076 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06076N002 full img2.fits acisf06076N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 04:02 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590403

Instrument: ACIS Obs ID: 6076 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T07:33:37 Date and time of file creation DATE-OBS 2004-12-19T10:54:59 Observation start date DATE-END 2004-12-19T13:28:34 Observation end date RA PNT 15.714464092913 Pointing RA DEC PNT -71.834721398323 Pointing Dec ROLL PNT 294.49585565394 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T08:01:07 Date and time of file creation DATE-OBS 2004-12-19T10:54:59 Observation start date DATE-END 2004-12-19T13:28:34 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S1,-120,13.29,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6076 Observation id SEQ NUM 590403 Sequence number RA NOM 15.714464092913 Nominal RA DEC NOM -71.834721398323 Nominal Dec ROLL NOM 294.49585565394 Nominal Roll

Summary Page Created:Fri April 7, 2006 04:02 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590403

Instrument: ACIS Obs ID: 6076 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.010729 -72.030338 17678.685547 195.573303 90.394165 15.527037 -71.687877 184.617493 17.575388 10.504319 15.907378 -72.026482 192.456253 23.792145 8.089067 15.934519 -72.135145 150.189362 26.823427 5.599186 15.910004 -72.116183 130.493744 29.493263 4.424527 16.304207 -72.088110 108.794022 25.021772 4.347974 16.119404 -72.109348 136.109634 32.342541 4.208378 15.835954 -72.071836 80.625000 20.315493 3.968646 16.275758 -72.062699 106.860718 26.944134 3.966010 15.789332 -72.043991 71.664452 18.420559 3.890460