Summary Page Created:Fri April 7, 2006 04:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590405

Instrument: ACIS Obs ID: 6078 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

acisf06078N002 full img2.fits acisf06078N002 cntr img2.fits

Summary Page Created:Fri April 7, 2006 04:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590405

Instrument: ACIS Obs ID: 6078 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T07:47:30 Date and time of file creation DATE-OBS 2004-12-19T15:50:24 Observation start date DATE-END 2004-12-19T18:22:11 Observation end date RA PNT 15.89600023226 Pointing RA DEC PNT -71.958108640549 Pointing Dec ROLL PNT 294.41686073139 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-07T08:16:01 Date and time of file creation DATE-OBS 2004-12-19T15:50:24 Observation start date DATE-END 2004-12-19T18:22:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S2,-120,5.15,0,0] Source name TITLE AO6A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6078 Observation id SEQ NUM 590405 Sequence number RA NOM 15.89600023226 Nominal RA DEC NOM -71.958108640549 Nominal Dec ROLL NOM 294.41686073139 Nominal Roll

Summary Page Created:Fri April 7, 2006 04:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590405

Instrument: ACIS Obs ID: 6078 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO6A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019670 -72.032555 830.000000 55.028679 15.083044 16.015374 -72.034903 784.420471 55.054214 14.248146 15.999880 -72.028412 722.416687 53.815891 13.423854 15.906336 -72.025870 232.857147 17.681614 13.169450 16.010720 -72.027014 535.166687 49.543465 10.801963 16.004119 -72.034551 591.708313 58.998562 10.029200 15.997680 -72.031807 495.541656 54.994736 9.010711 16.019722 -72.029074 407.291656 48.131165 8.462119 15.529395 -71.687461 163.269638 19.296455 8.461121 16.008595 -72.031867 272.541656 39.795887 6.848489