Summary Page Created:Sun April 2, 2006 13:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590408

Instrument: ACIS Obs ID: 6081 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

acisf06081N002 full img2.fits acisf06081N002 cntr img2.fits

Summary Page Created:Sun April 2, 2006 13:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590408

Instrument: ACIS Obs ID: 6081 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T16:55:56 Date and time of file creation DATE-OBS 2005-10-23T04:27:19 Observation start date DATE-END 2005-10-23T05:26:39 Observation end date RA PNT 350.7013491258 Pointing RA DEC PNT 58.817587433655 Pointing Dec ROLL PNT 226.2994670998 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-02T17:42:52 Date and time of file creation DATE-OBS 2005-10-23T04:27:19 Observation start date DATE-END 2005-10-23T05:26:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Cas A[I3,-120,-3.0,3.5,0] Source name TITLE AO6B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6081 Observation id SEQ NUM 590408 Sequence number RA NOM 350.7013491258 Nominal RA DEC NOM 58.817587433655 Nominal Dec ROLL NOM 226.2994670998 Nominal Roll

Summary Page Created:Sun April 2, 2006 13:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590408

Instrument: ACIS Obs ID: 6081 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.898780 58.834778 1496.334961 67.334846 22.222298 350.886775 58.796352 1012.829529 53.934898 18.778742 350.927376 58.816412 951.262085 66.092522 14.392884 350.849223 58.840431 678.000000 50.027443 13.552561 350.880858 58.796232 482.329559 38.491554 12.530789 350.870988 58.828587 369.666656 31.386667 11.777824 350.923024 58.811940 735.731018 65.467316 11.238143 350.858221 58.801121 391.416656 35.894218 10.904727 350.938355 58.819684 448.988647 43.053429 10.428638 350.854010 58.840793 442.666656 44.319332 9.988117