Summary Page Created:Sat November 24, 2007 16:08 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590410

Instrument: HRC Obs ID: 6083 Source: Cas A PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

hrcf06083N003 full img2.fits hrcf06083N003 cntr img2.fits

Summary Page Created:Sat November 24, 2007 16:08 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590410

Instrument: HRC Obs ID: 6083 Source: Cas A PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T20:50:54 Date and time of file creation DATE-OBS 2005-10-23T06:30:09 Observation start date DATE-END 2005-10-23T08:15:05 Observation end date RA PNT 350.85025073487 Pointing RA DEC PNT 58.81296137323 Pointing Dec ROLL PNT 225.94576278567 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T21:06:37 Date and time of file creation DATE-OBS 2005-10-23T06:30:09 Observation start date DATE-END 2005-10-23T08:15:05 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Cas A Source name TITLE AO6B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 6083 Observation id SEQ NUM 590410 Sequence number RA NOM 350.85025073487 Nominal RA DEC NOM 58.81296137323 Nominal Dec ROLL NOM 225.94576278567 Nominal Roll

Summary Page Created:Sat November 24, 2007 16:08 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590410

Instrument: HRC Obs ID: 6083 Source: Cas A PI: Dr. CXC Calibration Title: AO6B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.852846 58.840674 293.136353 27.747421 10.564454 350.866387 58.811822 142.500000 14.296105 9.967750 350.881274 58.796270 233.625000 25.926079 9.011197 350.837448 58.841322 233.636368 28.101593 8.313990 350.848562 58.840197 262.295441 32.678017 8.026664 350.870309 58.828735 155.750000 20.754345 7.504453 350.952789 58.818144 133.875000 18.576563 7.206662 350.871502 58.840888 169.954544 23.788103 7.144518 350.910908 58.805016 174.170456 25.876631 6.730801 350.886327 58.796727 184.704544 28.051394 6.584505