Summary Page Created:Sat March 4, 2006 03:04 EST page: 1 of 2

Chandra X-ray Center Seq Num: 0

Instrument: ACIS Obs ID: 59649 Source: PI: CHANDRA engineering request/realtime commanding Title: ACIS-012367 diagnostics

acisf59649 000N002 full img2.fits

Summary Page Created:Sat March 4, 2006 03:04 EST page: 2 of 2

Chandra X-ray Center Seq Num: 0

Instrument: ACIS Obs ID: 59649 Source: PI: CHANDRA engineering request/realtime commanding Title: ACIS-012367 diagnostics

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-03-04T07:54:48 Date and time of file creation DATE-OBS 2005-05-23T16:46:35 Observation start date DATE-END 2005-05-24T03:51:58 Observation end date RA PNT 232.48344490944 Pointing RA DEC PNT 4.480043091355 Pointing Dec ROLL PNT 197.17574717636 Pointing Roll RA TARG 0.0 Observer’s specified target RA DEC TARG 0.0 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-03-04T08:04:05 Date and time of file creation DATE-OBS 2005-05-23T16:46:35 Observation start date DATE-END 2005-05-24T03:51:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Source name TITLE ACIS-012367 diagnostics Proposal title OBSERVER CHANDRA engineering request/realtime commanding

Principal investig

OBS ID 59649 Observation id SEQ NUM Sequence number RA NOM 232.48344490944 Nominal RA DEC NOM 4.480043091355 Nominal Dec ROLL NOM 197.17574717636 Nominal Roll