Summary Page Created:Wed May 30, 2007 07:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200041

Instrument: ACIS Obs ID: 616 Source: VB 10 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

acisf00616N003 full img2.fits acisf00616N003 cntr img2.fits

Summary Page Created:Wed May 30, 2007 07:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200041

Instrument: ACIS Obs ID: 616 Source: VB 10 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T11:17:52 Date and time of file creation DATE-OBS 2000-07-04T20:40:18 Observation start date DATE-END 2000-07-05T01:17:34 Observation end date RA PNT 289.2285241469 Pointing RA DEC PNT 5.1547510535697 Pointing Dec ROLL PNT 170.42375206102 Pointing Roll RA TARG 289.237917 Observer’s specified target RA DEC TARG 5.151361 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 154.41346741 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T11:43:36 Date and time of file creation DATE-OBS 2000-07-04T20:40:18 Observation start date DATE-END 2000-07-05T01:17:34 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT VB 10 Source name TITLE X-RAY EMISSION AT THE BOT- TOM OF THE MAIN SEQUENCE

Proposal title

OBSERVER DR. THOMAS FLEMING Principal investigator OBS ID 616 Observation id SEQ NUM 200041 Sequence number RA NOM 289.2285241469 Nominal RA DEC NOM 5.1547510535697 Nominal Dec ROLL NOM 170.42375206102 Nominal Roll

Summary Page Created:Wed May 30, 2007 07:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200041

Instrument: ACIS Obs ID: 616 Source: VB 10 PI: DR. THOMAS FLEMING Title: X-RAY EMISSION AT THE BOTTOM OF THE MAIN SEQUENCE

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 289.230172 5.168770 668.285706 27.852571 23.993681 288.938516 5.264533 271.003326 37.461807 7.234123 289.156012 5.208634 59.318180 9.448987 6.277730 289.047685 5.249589 117.760796 21.917061 5.373020 288.926142 5.200488 214.674423 39.980335 5.369500 288.919730 5.160955 214.139542 40.176117 5.330021 288.970242 5.258610 183.041672 36.127399 5.066561 288.950151 5.262290 182.112503 36.472488 4.993147 288.919642 5.142556 185.016617 37.077763 4.989961 288.985945 5.257804 141.704544 30.086708 4.709872