Summary Page Created:Wed May 30, 2007 16:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 600145

Instrument: ACIS Obs ID: 1730 Source: M33 PI: Dr. Jonathan McDowell Title: THE X-RAY SOURCE POPULATION OF M33

acisf01730N003 full img2.fits acisf01730N003 cntr img2.fits

Summary Page Created:Wed May 30, 2007 16:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 600145

Instrument: ACIS Obs ID: 1730 Source: M33 PI: Dr. Jonathan McDowell Title: THE X-RAY SOURCE POPULATION OF M33

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T20:24:59 Date and time of file creation DATE-OBS 2000-07-12T08:29:46 Observation start date DATE-END 2000-07-12T22:55:58 Observation end date RA PNT 23.462117807672 Pointing RA DEC PNT 30.665080760862 Pointing Dec ROLL PNT 108.57868324372 Pointing Roll RA TARG 23.461667 Observer’s specified target RA DEC TARG 30.660167 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-05-30T20:57:08 Date and time of file creation DATE-OBS 2000-07-12T08:29:46 Observation start date DATE-END 2000-07-12T22:55:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT M33 Source name TITLE THE X-RAY SOURCE POPULA- TION OF M33

Proposal title

OBSERVER Dr. Jonathan McDowell Principal investigator OBS ID 1730 Observation id SEQ NUM 600145 Sequence number RA NOM 23.462117807672 Nominal RA DEC NOM 30.665080760862 Nominal Dec ROLL NOM 108.57868324372 Nominal Roll

Summary Page Created:Wed May 30, 2007 16:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 600145

Instrument: ACIS Obs ID: 1730 Source: M33 PI: Dr. Jonathan McDowell Title: THE X-RAY SOURCE POPULATION OF M33

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 23.462111 30.660156 6986.000000 100.147583 69.757050 23.392170 30.536518 5225.011230 76.318741 68.463020 23.351759 30.733970 1870.751709 46.900223 39.887909 23.223441 30.637959 884.974976 38.327030 23.090101 23.158403 30.474124 1123.088379 73.853928 15.206888 23.380207 30.559253 286.863647 19.995609 14.346332 23.225980 30.553595 826.960754 60.680973 13.628008 23.114043 30.585412 789.328918 63.997200 12.333803 23.370916 30.704720 188.416672 16.084858 11.713916 23.372038 30.752326 197.172409 17.029131 11.578536