Summary Page Created:Tue November 20, 2007 08:48 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600035

Instrument: HRC Obs ID: 275 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

hrcf00275N004 full img2.fits hrcf00275N004 cntr img2.fits

Summary Page Created:Tue November 20, 2007 08:48 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600035

Instrument: HRC Obs ID: 275 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:39:14 Date and time of file creation DATE-OBS 2000-08-18T10:16:06 Observation start date DATE-END 2000-08-18T10:41:16 Observation end date RA PNT 10.682913504536 Pointing RA DEC PNT 41.273139606883 Pointing Dec ROLL PNT 134.00231278583 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T13:47:42 Date and time of file creation DATE-OBS 2000-08-18T10:16:06 Observation start date DATE-END 2000-08-18T10:41:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - CENTER Source name TITLE MONITORING M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 275 Observation id SEQ NUM 600035 Sequence number RA NOM 10.682913504536 Nominal RA DEC NOM 41.273139606883 Nominal Dec ROLL NOM 134.00231278583 Nominal Roll

Summary Page Created:Tue November 20, 2007 08:48 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600035

Instrument: HRC Obs ID: 275 Source: M31 - CENTER PI: Dr. Stephen Murray Title: MONITORING M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660814 41.267669 237.541672 17.424995 13.632237 10.794040 41.247555 70.791664 10.382651 6.818265 10.716594 41.518524 84.250000 12.487940 6.746509 10.617788 41.206482 55.000000 8.686855 6.331405 10.718772 41.315068 52.916668 8.907916 5.940409 10.728854 41.267554 47.000000 8.265973 5.685961 10.702128 41.255904 44.958332 8.202412 5.481112 10.629793 41.272557 44.000000 8.055131 5.462357 10.576527 41.206603 41.000000 7.739851 5.297259 10.666688 41.263249 36.958332 7.619361 4.850582