Summary Page Created:Mon November 6, 2006 09:47 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800108

Instrument: ACIS Obs ID: 2419 Source: A2256 PI: Dr. Stephen Murray Title: MASS DISTRIBUTIONS OF RELAXED CLUSTERS

acisf02419N002 full img2.fits acisf02419N002 cntr img2.fits

Summary Page Created:Mon November 6, 2006 09:47 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800108

Instrument: ACIS Obs ID: 2419 Source: A2256 PI: Dr. Stephen Murray Title: MASS DISTRIBUTIONS OF RELAXED CLUSTERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-06T14:21:25 Date and time of file creation DATE-OBS 2001-02-06T20:55:58 Observation start date DATE-END 2001-02-07T00:47:20 Observation end date RA PNT 256.04655492146 Pointing RA DEC PNT 78.663787672251 Pointing Dec ROLL PNT 62.38397129903 Pointing Roll RA TARG 256.04479 Observer’s specified target RA DEC TARG 78.631 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-06T14:45:46 Date and time of file creation DATE-OBS 2001-02-06T20:55:58 Observation start date DATE-END 2001-02-07T00:47:20 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT A2256 Source name TITLE MASS DISTRIBUTIONS OF RE- LAXED CLUSTERS

Proposal title

OBSERVER Dr. Stephen Murray Principal investigator OBS ID 2419 Observation id SEQ NUM 800108 Sequence number RA NOM 256.04655492146 Nominal RA DEC NOM 78.663787672251 Nominal Dec ROLL NOM 62.38397129903 Nominal Roll

Summary Page Created:Mon November 6, 2006 09:47 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800108

Instrument: ACIS Obs ID: 2419 Source: A2256 PI: Dr. Stephen Murray Title: MASS DISTRIBUTIONS OF RELAXED CLUSTERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 256.937404 78.660536 152.234482 16.185415 9.405658 256.022544 78.717543 82.397728 10.828991 7.608994 256.494228 78.963199 267.900330 35.795479 7.484195 257.057299 78.904806 251.588043 35.261620 7.134897 256.828086 78.930476 241.591370 39.980267 6.042765 256.931382 78.917429 242.102997 42.733372 5.665431 256.660988 78.944678 230.707642 42.020638 5.490341 256.459739 78.951810 200.057144 36.672417 5.455248 256.873579 78.831484 102.725487 23.181877 4.431284 255.655772 78.625952 47.958332 11.536008 4.157273