Summary Page Created:Thu May 31, 2007 22:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800007

Instrument: ACIS Obs ID: 499 Source: A2204 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2204

acisf00499N003 full img2.fits acisf00499N003 cntr img2.fits

Summary Page Created:Thu May 31, 2007 22:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800007

Instrument: ACIS Obs ID: 499 Source: A2204 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2204

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-01T02:35:30 Date and time of file creation DATE-OBS 2000-07-29T02:49:42 Observation start date DATE-END 2000-07-29T06:05:25 Observation end date RA PNT 248.18567726207 Pointing RA DEC PNT 5.557393680659 Pointing Dec ROLL PNT 246.33253844783 Pointing Roll RA TARG 248.195833 Observer’s specified target RA DEC TARG 5.575833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-01T02:56:31 Date and time of file creation DATE-OBS 2000-07-29T02:49:42 Observation start date DATE-END 2000-07-29T06:05:25 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT A2204 Source name TITLE THE MASSIVE COOLING FLOW IN A2204

Proposal title

OBSERVER Professor Andrew Fabian Principal investigator OBS ID 499 Observation id SEQ NUM 800007 Sequence number RA NOM 248.18567726207 Nominal RA DEC NOM 5.557393680659 Nominal Dec ROLL NOM 246.33253844783 Nominal Roll

Summary Page Created:Thu May 31, 2007 22:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800007

Instrument: ACIS Obs ID: 499 Source: A2204 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2204

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 248.097652 5.429418 416.515015 23.583569 17.661238 248.113405 5.341234 358.106384 31.061943 11.528783 248.110231 5.340158 249.960785 31.742010 7.874762 248.008565 5.301958 232.644516 33.618744 6.920084 247.993629 5.549794 95.833336 13.895846 6.896545 248.119371 5.256184 242.365448 35.653126 6.797873 248.292574 5.719905 81.958336 13.063097 6.274035 248.168468 5.454937 60.384998 10.047298 6.010073 248.014792 5.594720 62.124138 11.302298 5.496593 248.026994 5.636245 53.089657 10.293282 5.157700