Summary Page Created:Sat June 9, 2007 16:30 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800008

Instrument: ACIS Obs ID: 500 Source: A2390 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2390

acisf00500N002 full img2.fits acisf00500N002 cntr img2.fits

Summary Page Created:Sat June 9, 2007 16:30 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800008

Instrument: ACIS Obs ID: 500 Source: A2390 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2390

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-09T20:01:19 Date and time of file creation DATE-OBS 2000-10-08T00:43:14 Observation start date DATE-END 2000-10-08T04:06:42 Observation end date RA PNT 328.39684280643 Pointing RA DEC PNT 17.675475612753 Pointing Dec ROLL PNT 261.05486617351 Pointing Roll RA TARG 328.402083 Observer’s specified target RA DEC TARG 17.695833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-09T20:29:18 Date and time of file creation DATE-OBS 2000-10-08T00:43:14 Observation start date DATE-END 2000-10-08T04:06:42 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT A2390 Source name TITLE THE MASSIVE COOLING FLOW IN A2390

Proposal title

OBSERVER Professor Andrew Fabian Principal investigator OBS ID 500 Observation id SEQ NUM 800008 Sequence number RA NOM 328.39684280643 Nominal RA DEC NOM 17.675475612753 Nominal Dec ROLL NOM 261.05486617351 Nominal Roll

Summary Page Created:Sat June 9, 2007 16:30 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800008

Instrument: ACIS Obs ID: 500 Source: A2390 PI: Professor Andrew Fabian Title: THE MASSIVE COOLING FLOW IN A2390

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 328.419978 17.737674 143.571426 13.978270 10.271045 328.395106 17.608681 115.142860 12.525589 9.192610 328.391745 17.711514 76.571426 11.051650 6.928506 328.287337 17.381875 203.541534 31.311161 6.500606 328.329924 17.701226 63.428570 9.786302 6.481363 328.336480 17.688753 47.238636 8.561748 5.517406 328.414621 17.368077 156.910294 29.304758 5.354431 328.289451 17.429661 134.329544 25.128618 5.345680 328.288998 17.412909 161.583328 30.555670 5.288162 328.388447 17.702886 44.428570 8.616951 5.155951