Summary Page Created:Wed June 6, 2007 15:13 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800038

Instrument: ACIS Obs ID: 530 Source: A586 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00530N002 full img2.fits acisf00530N002 cntr img2.fits

Summary Page Created:Wed June 6, 2007 15:13 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800038

Instrument: ACIS Obs ID: 530 Source: A586 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T18:33:17 Date and time of file creation DATE-OBS 2000-09-05T20:46:03 Observation start date DATE-END 2000-09-06T00:03:13 Observation end date RA PNT 113.14074755629 Pointing RA DEC PNT 31.675857525406 Pointing Dec ROLL PNT 73.93819388835 Pointing Roll RA TARG 113.083133 Observer’s specified target RA DEC TARG 31.633403 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 154.09092712 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-06T19:11:45 Date and time of file creation DATE-OBS 2000-09-05T20:46:03 Observation start date DATE-END 2000-09-06T00:03:13 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A586 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 530 Observation id SEQ NUM 800038 Sequence number RA NOM 113.14074755629 Nominal RA DEC NOM 31.675857525406 Nominal Dec ROLL NOM 73.93819388835 Nominal Roll

Summary Page Created:Wed June 6, 2007 15:13 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800038

Instrument: ACIS Obs ID: 530 Source: A586 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 113.130378 31.817347 125.034088 13.453751 9.293623 113.110754 31.703431 112.285713 12.850216 8.738041 113.006001 31.786833 113.974998 13.093145 8.704936 113.070919 31.613887 84.750000 11.222955 7.551487 113.179863 31.686347 78.428574 10.607295 7.393834 113.283689 31.681352 49.048275 9.324027 5.260417 113.139373 31.636664 32.000000 7.138037 4.483026 112.852281 31.789600 63.000000 16.180700 3.893528 112.791506 31.804633 69.813164 18.290731 3.816860 112.790033 31.816782 69.734039 18.706055 3.727886