Summary Page Created:Tue June 12, 2007 10:16 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800060

Instrument: ACIS Obs ID: 552 Source: RX J2129.6+0005 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

acisf00552N002 full img2.fits acisf00552N002 cntr img2.fits

Summary Page Created:Tue June 12, 2007 10:16 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800060

Instrument: ACIS Obs ID: 552 Source: RX J2129.6+0005 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T13:50:03 Date and time of file creation DATE-OBS 2000-10-21T10:14:02 Observation start date DATE-END 2000-10-21T13:34:47 Observation end date RA PNT 322.42619567468 Pointing RA DEC PNT 0.036207291780532 Pointing Dec ROLL PNT 282.29386399964 Pointing Roll RA TARG 322.416608 Observer’s specified target RA DEC TARG 0.089931 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T14:16:00 Date and time of file creation DATE-OBS 2000-10-21T10:14:02 Observation start date DATE-END 2000-10-21T13:34:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT RX J2129.6+0005 Source name TITLE DETERMINATION OF H0/Q0 Proposal title OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 552 Observation id SEQ NUM 800060 Sequence number RA NOM 322.42619567468 Nominal RA DEC NOM 0.036207291780532 Nominal Dec ROLL NOM 282.29386399964 Nominal Roll

Summary Page Created:Tue June 12, 2007 10:16 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800060

Instrument: ACIS Obs ID: 552 Source: RX J2129.6+0005 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0/Q0

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 322.416293 0.089117 106.102272 19.567839 5.422278 322.299115 -0.077355 47.172413 11.278316 4.182576 322.287987 0.093900 34.636364 8.372549 4.136896 322.352979 -0.125522 33.636364 8.303356 4.050936 322.447031 -0.085938 33.636364 8.303356 4.050936 322.380203 -0.114814 40.564999 10.064652 4.030442 322.487753 0.035576 25.000000 6.312607 3.960329 322.267521 0.023306 37.564999 9.894118 3.796700 322.415946 0.091114 45.420456 12.425457 3.655435 322.472683 0.051208 23.000000 6.344512 3.625180