Summary Page Created:Fri January 19, 2007 18:48 EST page: 1 of 3

Chandra X-ray Center Seq Num: 100016

Instrument: ACIS Obs ID: 3406 Source: 1998 WT24 PI: Professor Gordon Garmire Title: ASTEROID OBSERVATION

acisf03406N002 full img2.fits acisf03406N002 cntr img2.fits

Summary Page Created:Fri January 19, 2007 18:48 EST page: 2 of 3

Chandra X-ray Center Seq Num: 100016

Instrument: ACIS Obs ID: 3406 Source: 1998 WT24 PI: Professor Gordon Garmire Title: ASTEROID OBSERVATION

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-19T23:37:10 Date and time of file creation DATE-OBS 2001-12-11T16:36:08 Observation start date DATE-END 2001-12-11T17:50:11 Observation end date RA PNT 120.96746832553 Pointing RA DEC PNT 12.584150718698 Pointing Dec ROLL PNT 69.409791042367 Pointing Roll RA TARG 120.9624 Observer’s specified target RA DEC TARG 12.5757 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-19T23:46:49 Date and time of file creation DATE-OBS 2001-12-11T16:36:08 Observation start date DATE-END 2001-12-11T17:50:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT 1998 WT24 Source name TITLE ASTEROID OBSERVATION Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 3406 Observation id SEQ NUM 100016 Sequence number RA NOM 120.96746832553 Nominal RA DEC NOM 12.584150718698 Nominal Dec ROLL NOM 69.409791042367 Nominal Roll

Summary Page Created:Fri January 19, 2007 18:48 EST page: 3 of 3

Chandra X-ray Center Seq Num: 100016

Instrument: ACIS Obs ID: 3406 Source: 1998 WT24 PI: Professor Gordon Garmire Title: ASTEROID OBSERVATION

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 120.856096 12.419541 123.333336 13.914715 8.863519 121.016078 12.890547 104.817276 19.235548 5.449144 121.016862 12.884977 96.124107 20.964384 4.585114 121.210600 12.544617 35.549019 9.299794 3.822560 121.108932 12.858652 85.162788 22.960855 3.709043 121.134774 12.846951 79.385384 21.971792 3.613059 120.912338 12.490493 25.692499 7.220803 3.558122 121.005098 12.573387 21.000000 6.150888 3.414141 121.041513 12.884653 70.455147 20.967054 3.360279 121.002842 12.854996 57.988636 17.451569 3.322832