Summary Page Created:Thu August 31, 2006 09:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200086

Instrument: ACIS Obs ID: 3427 Source: HD100546 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

acisf03427N003 full img2.fits acisf03427N003 cntr img2.fits

Summary Page Created:Thu August 31, 2006 09:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200086

Instrument: ACIS Obs ID: 3427 Source: HD100546 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-31T13:39:48 Date and time of file creation DATE-OBS 2002-02-04T21:43:36 Observation start date DATE-END 2002-02-04T22:52:04 Observation end date RA PNT 173.43741739572 Pointing RA DEC PNT -70.198407823802 Pointing Dec ROLL PNT 33.715871025104 Pointing Roll RA TARG 173.355833 Observer’s specified target RA DEC TARG -70.194722 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-31T13:56:21 Date and time of file creation DATE-OBS 2002-02-04T21:43:36 Observation start date DATE-END 2002-02-04T22:52:04 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT HD100546 Source name TITLE OBSERVATION OF SCO-CEN OUTLYERS

Proposal title

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 3427 Observation id SEQ NUM 200086 Sequence number RA NOM 173.43741739572 Nominal RA DEC NOM -70.198407823802 Nominal Dec ROLL NOM 33.715871025104 Nominal Roll

Summary Page Created:Thu August 31, 2006 09:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200086

Instrument: ACIS Obs ID: 3427 Source: HD100546 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 173.415269 -70.134968 43.079544 7.981264 5.397585 173.355865 -70.194804 38.000000 7.612880 4.991540 173.216358 -69.980514 37.352940 8.781400 4.253643 173.427414 -70.352734 31.590000 7.884274 4.006710 172.693839 -69.997750 63.061836 16.687010 3.779097 173.169113 -70.012103 24.166071 7.421587 3.256187 173.225734 -69.980648 27.864361 8.711115 3.198714