Summary Page Created:Thu August 31, 2006 00:49 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200087

Instrument: ACIS Obs ID: 3428 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

acisf03428N003 full img2.fits acisf03428N003 cntr img2.fits

Summary Page Created:Thu August 31, 2006 00:49 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200087

Instrument: ACIS Obs ID: 3428 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-31T04:36:59 Date and time of file creation DATE-OBS 2002-02-04T19:31:58 Observation start date DATE-END 2002-02-04T20:43:58 Observation end date RA PNT 180.15826084037 Pointing RA DEC PNT -78.193567804015 Pointing Dec ROLL PNT 40.488506268333 Pointing Roll RA TARG 180.02125 Observer’s specified target RA DEC TARG -78.193056 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-08-31T04:48:11 Date and time of file creation DATE-OBS 2002-02-04T19:31:58 Observation start date DATE-END 2002-02-04T20:43:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT HD104237 Source name TITLE OBSERVATION OF SCO-CEN OUTLYERS

Proposal title

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 3428 Observation id SEQ NUM 200087 Sequence number RA NOM 180.15826084037 Nominal RA DEC NOM -78.193567804015 Nominal Dec ROLL NOM 40.488506268333 Nominal Roll

Summary Page Created:Thu August 31, 2006 00:49 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200087

Instrument: ACIS Obs ID: 3428 Source: HD104237 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 180.020881 -78.192954 452.285706 23.467840 19.272575 179.615768 -77.908784 313.411621 21.595528 14.512801 180.038534 -78.195111 228.142853 17.438747 13.082525 180.034407 -78.194313 31.428572 7.695543 4.083996 178.825275 -78.020882 70.824471 18.260023 3.878663 178.912167 -78.045633 56.463394 16.505695 3.420843 178.966136 -77.996163 58.581394 17.202124 3.405475