Summary Page Created:Wed September 6, 2006 03:42 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200079

Instrument: ACIS Obs ID: 972 Source: M17 PI: Professor Gordon Garmire Title: OBSERVATION OF M17

acisf00972N002 full img2.fits acisf00972N002 cntr img2.fits

Summary Page Created:Wed September 6, 2006 03:42 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200079

Instrument: ACIS Obs ID: 972 Source: M17 PI: Professor Gordon Garmire Title: OBSERVATION OF M17

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T07:13:41 Date and time of file creation DATE-OBS 2002-03-02T17:05:03 Observation start date DATE-END 2002-03-03T04:44:52 Observation end date RA PNT 275.12655364418 Pointing RA DEC PNT -16.175021224 Pointing Dec ROLL PNT 89.186858777713 Pointing Roll RA TARG 275.124583 Observer’s specified target RA DEC TARG -16.179306 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 ASCDS version number DATE 2006-09-06T07:40:19 Date and time of file creation DATE-OBS 2002-03-02T17:05:03 Observation start date DATE-END 2002-03-03T04:44:52 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT M17 Source name TITLE OBSERVATION OF M17 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 972 Observation id SEQ NUM 200079 Sequence number RA NOM 275.12655364418 Nominal RA DEC NOM -16.175021224 Nominal Dec ROLL NOM 89.186858777713 Nominal Roll

Summary Page Created:Wed September 6, 2006 03:42 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200079

Instrument: ACIS Obs ID: 972 Source: M17 PI: Professor Gordon Garmire Title: OBSERVATION OF M17

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 275.124506 -16.179099 5527.143066 89.525063 61.738499 275.110861 -16.182125 2556.285645 53.797672 47.516663 275.149431 -16.261941 1109.333374 36.539886 30.359516 275.117328 -16.180368 540.285706 25.814283 20.929720 275.180949 -16.212802 408.465912 22.757193 17.948872 275.123416 -16.101052 387.285706 22.504353 17.209370 275.106265 -16.181608 325.714294 20.008711 16.278625 275.089332 -16.201887 345.571442 21.430201 16.125441 275.094057 -16.047536 370.958344 23.135380 16.034245 275.114234 -16.225267 270.954559 18.305199 14.802053