Summary Page Created:Fri December 8, 2006 06:51 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200088

Instrument: ACIS Obs ID: 981 Source: HD141569 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

acisf00981N002 full img2.fits acisf00981N002 cntr img2.fits

Summary Page Created:Fri December 8, 2006 06:51 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200088

Instrument: ACIS Obs ID: 981 Source: HD141569 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T11:38:30 Date and time of file creation DATE-OBS 2001-06-23T00:56:40 Observation start date DATE-END 2001-06-23T02:07:25 Observation end date RA PNT 237.46349175068 Pointing RA DEC PNT -3.9268859348994 Pointing Dec ROLL PNT 233.24059216047 Pointing Roll RA TARG 237.490833 Observer’s specified target RA DEC TARG -3.921111 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-08T11:50:59 Date and time of file creation DATE-OBS 2001-06-23T00:56:40 Observation start date DATE-END 2001-06-23T02:07:25 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT HD141569 Source name TITLE OBSERVATION OF SCO-CEN OUTLYERS

Proposal title

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 981 Observation id SEQ NUM 200088 Sequence number RA NOM 237.46349175068 Nominal RA DEC NOM -3.9268859348994 Nominal Dec ROLL NOM 233.24059216047 Nominal Roll

Summary Page Created:Fri December 8, 2006 06:51 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200088

Instrument: ACIS Obs ID: 981 Source: HD141569 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 237.488978 -3.919775 230.714279 17.313105 13.325991 237.676982 -3.980347 54.265293 15.118886 3.589239 237.694951 -4.128261 56.657806 17.069908 3.319163 237.753429 -4.059659 62.643616 18.971804 3.301933 237.768349 -4.026567 61.553192 19.399847 3.172870 237.571695 -4.207510 27.387501 8.821840 3.104511 237.560899 -4.206080 24.276785 8.052815 3.014695 237.764574 -4.021062 51.428570 17.119246 3.004138