Summary Page Created:Thu December 21, 2006 10:48 EST page: 1 of 3

Chandra X-ray Center Seq Num: 200089

Instrument: ACIS Obs ID: 982 Source: HD150193 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

acisf00982N003 full img2.fits acisf00982N003 cntr img2.fits

Summary Page Created:Thu December 21, 2006 10:48 EST page: 2 of 3

Chandra X-ray Center Seq Num: 200089

Instrument: ACIS Obs ID: 982 Source: HD150193 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-21T15:20:55 Date and time of file creation DATE-OBS 2001-08-19T16:16:31 Observation start date DATE-END 2001-08-19T17:30:16 Observation end date RA PNT 250.0515074855 Pointing RA DEC PNT -23.914523715752 Pointing Dec ROLL PNT 262.90185336771 Pointing Roll RA TARG 250.074583 Observer’s specified target RA DEC TARG -23.895833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-21T15:47:21 Date and time of file creation DATE-OBS 2001-08-19T16:16:31 Observation start date DATE-END 2001-08-19T17:30:16 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT HD150193 Source name TITLE OBSERVATION OF SCO-CEN OUTLYERS

Proposal title

OBSERVER Professor Gordon Garmire Principal investigator OBS ID 982 Observation id SEQ NUM 200089 Sequence number RA NOM 250.0515074855 Nominal RA DEC NOM -23.914523715752 Nominal Dec ROLL NOM 262.90185336771 Nominal Roll

Summary Page Created:Thu December 21, 2006 10:48 EST page: 3 of 3

Chandra X-ray Center Seq Num: 200089

Instrument: ACIS Obs ID: 982 Source: HD150193 PI: Professor Gordon Garmire Title: OBSERVATION OF SCO-CEN OUTLYERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 250.074477 -23.896047 185.571426 15.511378 11.963568 249.939254 -24.034074 95.077499 12.164476 7.815996 250.130373 -23.820930 26.006897 6.678865 3.893910 250.381472 -23.849719 71.830566 19.942146 3.601948 250.382054 -23.972310 57.900333 18.676867 3.100109 250.330831 -23.841684 41.931820 13.717109 3.056899 250.261388 -23.848033 29.581249 9.814482 3.014041