Summary Page Created:Tue November 20, 2007 16:22 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400125

Instrument: HRC Obs ID: 1912 Source: M31 PI: Prof. Philip Kaaret Title: SEARCHING FOR X-RAY PULSARS IN M31

hrcf01912N005 full img2.fits hrcf01912N005 cntr img2.fits

Summary Page Created:Tue November 20, 2007 16:22 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400125

Instrument: HRC Obs ID: 1912 Source: M31 PI: Prof. Philip Kaaret Title: SEARCHING FOR X-RAY PULSARS IN M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T20:12:03 Date and time of file creation DATE-OBS 2001-10-31T23:49:20 Observation start date DATE-END 2001-11-01T13:25:04 Observation end date RA PNT 10.671117974361 Pointing RA DEC PNT 41.267321101568 Pointing Dec ROLL PNT 226.83438027038 Pointing Roll RA TARG 10.67625 Observer’s specified target RA DEC TARG 41.269 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T21:20:25 Date and time of file creation DATE-OBS 2001-10-31T23:49:20 Observation start date DATE-END 2001-11-01T13:25:04 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 Source name TITLE SEARCHING FOR X-RAY PUL- SARS IN M31

Proposal title

OBSERVER Prof. Philip Kaaret Principal investigator OBS ID 1912 Observation id SEQ NUM 400125 Sequence number RA NOM 10.671021 Nominal RA DEC NOM 41.267325 Nominal Dec ROLL NOM 226.834444 Nominal Roll

Summary Page Created:Tue November 20, 2007 16:22 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400125

Instrument: HRC Obs ID: 1912 Source: M31 PI: Prof. Philip Kaaret Title: SEARCHING FOR X-RAY PULSARS IN M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.773639 41.284048 8591.416992 96.187660 89.319321 10.660803 41.267724 8707.166992 98.485977 88.410217 10.595603 41.259849 3344.068115 60.699574 55.092121 10.717209 41.518473 3770.833252 78.324554 48.143692 10.718855 41.261128 2044.714233 47.369701 43.165024 10.718882 41.315091 1823.204590 45.458054 40.107407 10.702165 41.255920 1821.125000 45.413902 40.100605 10.794174 41.247677 1792.738647 46.281059 38.735905 10.728924 41.267566 1626.285767 43.585022 37.312950 10.617929 41.206462 1612.428589 44.784389 36.004253