Summary Page Created:Sun December 31, 2006 01:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400126

Instrument: ACIS Obs ID: 1913 Source: SAX J1324.5-6313 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

acisf01913N002 full img2.fits acisf01913N002 cntr img2.fits

Summary Page Created:Sun December 31, 2006 01:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400126

Instrument: ACIS Obs ID: 1913 Source: SAX J1324.5-6313 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-31T06:09:10 Date and time of file creation DATE-OBS 2001-09-10T09:18:41 Observation start date DATE-END 2001-09-10T11:08:43 Observation end date RA PNT 201.09271728102 Pointing RA DEC PNT -63.227878611135 Pointing Dec ROLL PNT 214.25784903186 Pointing Roll RA TARG 201.1125 Observer’s specified target RA DEC TARG -63.223889 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-12-31T06:34:56 Date and time of file creation DATE-OBS 2001-09-10T09:18:41 Observation start date DATE-END 2001-09-10T11:08:43 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SAX J1324.5-6313 Source name TITLE X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Proposal tit

OBSERVER PROF FRANK VERBUNT Principal investigator OBS ID 1913 Observation id SEQ NUM 400126 Sequence number RA NOM 201.09271728102 Nominal RA DEC NOM -63.227878611135 Nominal Dec ROLL NOM 214.25784903186 Nominal Roll

Summary Page Created:Sun December 31, 2006 01:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400126

Instrument: ACIS Obs ID: 1913 Source: SAX J1324.5-6313 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 201.126293 -63.230495 82.428574 10.814426 7.622094 200.607158 -63.448694 169.279068 28.260056 5.990047 200.455043 -63.345376 130.029907 25.927246 5.015183 200.582295 -63.435746 129.388702 30.126598 4.294833 200.476255 -63.341399 110.552681 27.935585 3.957414 200.683882 -63.428134 91.102272 23.093760 3.944887 200.479150 -63.363636 119.325584 30.992105 3.850193 200.528564 -63.394774 108.576782 29.205322 3.717705 201.250231 -63.227072 27.428572 7.383908 3.714642 200.512470 -63.389930 97.598007 27.844931 3.505055