Summary Page Created:Wed January 10, 2007 21:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 400129

Instrument: ACIS Obs ID: 1916 Source: SAX J1806.5-2215 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

acisf01916N002 full img2.fits acisf01916N002 cntr img2.fits

Summary Page Created:Wed January 10, 2007 21:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 400129

Instrument: ACIS Obs ID: 1916 Source: SAX J1806.5-2215 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-11T02:18:33 Date and time of file creation DATE-OBS 2001-10-24T09:20:26 Observation start date DATE-END 2001-10-24T11:03:16 Observation end date RA PNT 271.64073370564 Pointing RA DEC PNT -22.284080624408 Pointing Dec ROLL PNT 271.51932433105 Pointing Roll RA TARG 271.641667 Observer’s specified target RA DEC TARG -22.251667 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-01-11T02:34:26 Date and time of file creation DATE-OBS 2001-10-24T09:20:26 Observation start date DATE-END 2001-10-24T11:03:16 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT SAX J1806.5-2215 Source name TITLE X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Proposal tit

OBSERVER PROF FRANK VERBUNT Principal investigator OBS ID 1916 Observation id SEQ NUM 400129 Sequence number RA NOM 271.64073370564 Nominal RA DEC NOM -22.284080624408 Nominal Dec ROLL NOM 271.51932433105 Nominal Roll

Summary Page Created:Wed January 10, 2007 21:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 400129

Instrument: ACIS Obs ID: 1916 Source: SAX J1806.5-2215 PI: PROF FRANK VERBUNT Title: X-RAY BURSTERS WITH LOW PERSISTENT X-RAY LUMINOSITIES

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 271.667663 -22.323728 105.285713 12.549164 8.389859 271.584119 -22.591195 163.156143 24.055428 6.782508 271.577014 -22.289940 51.079544 8.535064 5.984671 271.479569 -22.214026 55.282501 9.905658 5.580902 271.371277 -22.164054 63.458332 13.394145 4.737766 271.711762 -22.586122 118.265778 26.144720 4.523505 271.578667 -22.509835 77.647057 17.320332 4.483001 271.717242 -22.493452 65.197472 15.935919 4.091228 271.578711 -22.500593 65.835770 18.051325 3.647143 271.675023 -22.365260 21.000000 5.987958 3.507038