Summary Page Created:Wed November 15, 2006 12:15 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500191

Instrument: ACIS Obs ID: 2314 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

acisf02314N002 full img2.fits acisf02314N002 cntr img2.fits

Summary Page Created:Wed November 15, 2006 12:15 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500191

Instrument: ACIS Obs ID: 2314 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-15T16:52:06 Date and time of file creation DATE-OBS 2001-03-18T08:09:04 Observation start date DATE-END 2001-03-18T09:39:41 Observation end date RA PNT 244.46579264247 Pointing RA DEC PNT -50.929570808864 Pointing Dec ROLL PNT 70.963808955457 Pointing Roll RA TARG 244.401292 Observer’s specified target RA DEC TARG -51.0402 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-15T17:14:07 Date and time of file creation DATE-OBS 2001-03-18T08:09:04 Observation start date DATE-END 2001-03-18T09:39:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE OBSERVATION OF SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 2314 Observation id SEQ NUM 500191 Sequence number RA NOM 244.46579264247 Nominal RA DEC NOM -50.929570808864 Nominal Dec ROLL NOM 70.963808955457 Nominal Roll

Summary Page Created:Wed November 15, 2006 12:15 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500191

Instrument: ACIS Obs ID: 2314 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400905 -51.040201 4415.827637 73.550819 60.037773 244.287270 -51.032454 77.977501 15.350153 5.079916 244.306764 -51.037061 100.386360 22.939718 4.376094 244.305049 -51.023109 96.693184 24.016171 4.026170 244.309279 -51.021165 89.166664 23.585270 3.780608 244.319530 -51.037437 92.284088 24.689756 3.737748 244.352437 -51.042440 58.833332 17.959160 3.275951 244.340627 -51.018179 51.558620 16.007517 3.220901 244.364077 -51.036285 45.647728 14.487303 3.150878 244.352562 -51.040036 61.208332 20.368742 3.005013