Summary Page Created:Wed November 29, 2006 07:06 EST page: 1 of 3

Chandra X-ray Center Seq Num: 500192

Instrument: ACIS Obs ID: 2315 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

acisf02315N002 full img2.fits acisf02315N002 cntr img2.fits

Summary Page Created:Wed November 29, 2006 07:06 EST page: 2 of 3

Chandra X-ray Center Seq Num: 500192

Instrument: ACIS Obs ID: 2315 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-29T11:41:43 Date and time of file creation DATE-OBS 2001-04-27T17:54:31 Observation start date DATE-END 2001-04-27T19:29:24 Observation end date RA PNT 244.53952895647 Pointing RA DEC PNT -50.960846355129 Pointing Dec ROLL PNT 43.468182986714 Pointing Roll RA TARG 244.401292 Observer’s specified target RA DEC TARG -51.0402 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-29T12:04:38 Date and time of file creation DATE-OBS 2001-04-27T17:54:31 Observation start date DATE-END 2001-04-27T19:29:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-3 Detector GRATING NONE Grating OBJECT RCW103 Source name TITLE OBSERVATION OF SNR RCW103 Proposal title OBSERVER Professor Gordon Garmire Principal investigator OBS ID 2315 Observation id SEQ NUM 500192 Sequence number RA NOM 244.53952895647 Nominal RA DEC NOM -50.960846355129 Nominal Dec ROLL NOM 43.468182986714 Nominal Roll

Summary Page Created:Wed November 29, 2006 07:06 EST page: 3 of 3

Chandra X-ray Center Seq Num: 500192

Instrument: ACIS Obs ID: 2315 Source: RCW103 PI: Professor Gordon Garmire Title: OBSERVATION OF SNR RCW103

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 244.400803 -51.040262 3825.593018 68.856407 55.558998 244.371438 -51.034488 78.431816 17.695663 4.432262 244.323508 -51.009712 65.056816 19.022848 3.419930 244.328443 -51.011518 64.204544 20.304375 3.162104 244.331007 -50.998802 60.500000 19.951880 3.032296