Summary Page Created:Wed November 21, 2007 03:43 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600124

Instrument: HRC Obs ID: 1567 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

hrcf01567N004 full img2.fits hrcf01567N004 cntr img2.fits

Summary Page Created:Wed November 21, 2007 03:43 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600124

Instrument: HRC Obs ID: 1567 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T08:33:26 Date and time of file creation DATE-OBS 2001-02-01T00:18:53 Observation start date DATE-END 2001-02-01T00:44:03 Observation end date RA PNT 10.535056431825 Pointing RA DEC PNT 40.918028241071 Pointing Dec ROLL PNT 305.89615576043 Pointing Roll RA TARG 10.533333 Observer’s specified target RA DEC TARG 40.921389 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T08:42:27 Date and time of file creation DATE-OBS 2001-02-01T00:18:53 Observation start date DATE-END 2001-02-01T00:44:03 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - SOUTH 1 Source name TITLE HRC MONITORING OF M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1567 Observation id SEQ NUM 600124 Sequence number RA NOM 10.535056431825 Nominal RA DEC NOM 40.918028241071 Nominal Dec ROLL NOM 305.89615576043 Nominal Roll

Summary Page Created:Wed November 21, 2007 03:43 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600124

Instrument: HRC Obs ID: 1567 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.166120 40.763400 78.837212 20.893286 3.773328 10.255573 41.163353 95.960136 25.875164 3.708580 10.236900 40.974925 60.333332 16.273331 3.707498 10.362836 41.193807 75.124107 20.423616 3.678296 10.178994 40.823285 69.916664 19.626400 3.562378 10.229239 40.711816 79.203575 22.395039 3.536657 10.858937 40.882928 48.833332 14.114020 3.459917 10.565285 41.020651 29.180000 8.440505 3.457139 10.892696 41.065785 74.926788 21.829123 3.432423 10.897204 41.087000 83.870430 24.441217 3.431516