Summary Page Created:Tue November 20, 2007 10:04 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600125

Instrument: HRC Obs ID: 1568 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

hrcf01568N003 full img2.fits hrcf01568N003 cntr img2.fits

Summary Page Created:Tue November 20, 2007 10:04 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600125

Instrument: HRC Obs ID: 1568 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T14:57:04 Date and time of file creation DATE-OBS 2001-06-10T21:47:50 Observation start date DATE-END 2001-06-10T22:13:00 Observation end date RA PNT 10.534043118085 Pointing RA DEC PNT 40.92498850423 Pointing Dec ROLL PNT 94.978357843589 Pointing Roll RA TARG 10.533333 Observer’s specified target RA DEC TARG 40.921389 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-20T15:03:41 Date and time of file creation DATE-OBS 2001-06-10T21:47:50 Observation start date DATE-END 2001-06-10T22:13:00 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - SOUTH 1 Source name TITLE HRC MONITORING OF M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1568 Observation id SEQ NUM 600125 Sequence number RA NOM 10.534043118085 Nominal RA DEC NOM 40.92498850423 Nominal Dec ROLL NOM 94.978357843589 Nominal Roll

Summary Page Created:Tue November 20, 2007 10:04 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600125

Instrument: HRC Obs ID: 1568 Source: M31 - SOUTH 1 PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.566091 41.020801 57.692501 9.431199 6.117197 10.677028 40.864874 31.397728 7.723756 4.065085 10.798364 40.767348 25.055172 7.862550 3.186647 10.619674 41.076638 23.041380 7.377460 3.123213 10.778081 40.874415 17.000000 5.563669 3.055537