Summary Page Created:Wed November 21, 2007 03:41 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600126

Instrument: HRC Obs ID: 1569 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

hrcf01569N004 full img2.fits hrcf01569N004 cntr img2.fits

Summary Page Created:Wed November 21, 2007 03:41 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600126

Instrument: HRC Obs ID: 1569 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T08:32:49 Date and time of file creation DATE-OBS 2001-02-01T00:44:03 Observation start date DATE-END 2001-02-01T01:09:12 Observation end date RA PNT 10.687169500808 Pointing RA DEC PNT 41.264872227745 Pointing Dec ROLL PNT 305.85318330867 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-21T08:40:33 Date and time of file creation DATE-OBS 2001-02-01T00:44:03 Observation start date DATE-END 2001-02-01T01:09:12 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT M31 - CENTER Source name TITLE HRC MONITORING OF M31 Proposal title OBSERVER Dr. Stephen Murray Principal investigator OBS ID 1569 Observation id SEQ NUM 600126 Sequence number RA NOM 10.687169500808 Nominal RA DEC NOM 41.264872227745 Nominal Dec ROLL NOM 305.85318330867 Nominal Roll

Summary Page Created:Wed November 21, 2007 03:41 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600126

Instrument: HRC Obs ID: 1569 Source: M31 - CENTER PI: Dr. Stephen Murray Title: HRC MONITORING OF M31

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.660783 41.267717 221.208328 17.493031 12.645513 10.717989 41.517831 106.482758 17.079069 6.234694 10.718811 41.315160 41.238636 8.150754 5.059487 10.595548 41.259796 43.142857 8.764964 4.922194 10.702096 41.255910 38.916668 7.958683 4.889838 10.794224 41.247586 40.833332 8.440770 4.837631 10.617767 41.206454 37.875000 8.064080 4.696754 10.718841 41.261119 32.000000 6.938706 4.611811 10.699481 41.259139 30.000000 6.827796 4.393804 10.629672 41.272686 32.714287 7.513943 4.353811