Summary Page Created:Fri January 5, 2007 07:37 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600132

Instrument: ACIS Obs ID: 1575 Source: M31 NUCLEUS PI: Dr Stephen Murray Title: M31 NUCLEAR REGION

acisf01575N002 full img2.fits acisf01575N002 cntr img2.fits

Summary Page Created:Fri January 5, 2007 07:37 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600132

Instrument: ACIS Obs ID: 1575 Source: M31 NUCLEUS PI: Dr Stephen Murray Title: M31 NUCLEAR REGION

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2007-01-05T11:44:51 Date and time of file creation DATE-OBS 2001-10-05T00:33:43 Observation start date DATE-END 2001-10-05T11:38:58 Observation end date RA PNT 10.668403294059 Pointing RA DEC PNT 41.278943379023 Pointing Dec ROLL PNT 180.42070157758 Pointing Roll RA TARG 10.685 Observer’s specified target RA DEC TARG 41.268972 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2007-01-05T12:34:20 Date and time of file creation DATE-OBS 2001-10-05T00:33:43 Observation start date DATE-END 2001-10-05T11:38:58 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT M31 NUCLEUS Source name TITLE M31 NUCLEAR REGION Proposal title OBSERVER Dr Stephen Murray Principal investigator OBS ID 1575 Observation id SEQ NUM 600132 Sequence number RA NOM 10.668403294059 Nominal RA DEC NOM 41.278943379023 Nominal Dec ROLL NOM 180.42070157758 Nominal Roll

Summary Page Created:Fri January 5, 2007 07:37 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600132

Instrument: ACIS Obs ID: 1575 Source: M31 NUCLEUS PI: Dr Stephen Murray Title: M31 NUCLEAR REGION

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 10.773700 41.284164 16821.142578 150.961548 111.426674 10.717118 41.519226 9329.291992 113.025299 82.541626 10.660769 41.267718 7714.000000 93.911247 82.141388 10.595626 41.259796 6173.170410 85.265182 72.399666 10.717821 41.517948 7171.293945 110.163849 65.096619 10.794171 41.247590 4742.056641 75.064888 63.172768 10.702184 41.255902 4433.428711 70.312660 63.053062 10.718833 41.315130 3915.704590 65.424110 59.851097 10.696519 41.274577 3685.714355 63.465130 58.074638 10.664901 41.270659 3027.142822 57.811348 52.362434