Summary Page Created:Tue November 14, 2006 14:17 EST page: 1 of 3

Chandra X-ray Center Seq Num: 600148

Instrument: ACIS Obs ID: 2014 Source: NGC2403 PI: DR MASSIMO CAPPI Title: THE ‘EFFERVESCENT’ SPIRAL GALAXY NGC2403

acisf02014N002 full img2.fits acisf02014N002 cntr img2.fits

Summary Page Created:Tue November 14, 2006 14:17 EST page: 2 of 3

Chandra X-ray Center Seq Num: 600148

Instrument: ACIS Obs ID: 2014 Source: NGC2403 PI: DR MASSIMO CAPPI Title: THE ‘EFFERVESCENT’ SPIRAL GALAXY NGC2403

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-14T18:34:35 Date and time of file creation DATE-OBS 2001-04-17T04:18:17 Observation start date DATE-END 2001-04-17T14:55:10 Observation end date RA PNT 114.20913889865 Pointing RA DEC PNT 65.579502656883 Pointing Dec ROLL PNT 266.79426799565 Pointing Roll RA TARG 114.21625 Observer’s specified target RA DEC TARG 65.600167 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-14T19:13:44 Date and time of file creation DATE-OBS 2001-04-17T04:18:17 Observation start date DATE-END 2001-04-17T14:55:10 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT NGC2403 Source name TITLE THE ‘EFFERVESCENT’ SPIRAL GALAXY NGC2403

Proposal title

OBSERVER DR MASSIMO CAPPI Principal investigator OBS ID 2014 Observation id SEQ NUM 600148 Sequence number RA NOM 114.20913889865 Nominal RA DEC NOM 65.579502656883 Nominal Dec ROLL NOM 266.79426799565 Nominal Roll

Summary Page Created:Tue November 14, 2006 14:17 EST page: 3 of 3

Chandra X-ray Center Seq Num: 600148

Instrument: ACIS Obs ID: 2014 Source: NGC2403 PI: DR MASSIMO CAPPI Title: THE ‘EFFERVESCENT’ SPIRAL GALAXY NGC2403

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 114.106526 65.594411 5370.454590 76.138008 70.535789 114.231673 65.594677 2644.285645 54.421692 48.588821 114.259810 65.659683 1453.750000 42.771984 33.988369 114.179123 65.772263 1031.249146 57.927742 17.802336 114.024532 65.278137 1324.790649 75.324448 17.587791 114.317075 65.271887 1311.694336 74.657700 17.569445 114.298391 65.562723 320.857147 21.292313 15.069154 114.295986 65.769477 851.542847 58.360886 14.590986 114.165410 65.772692 842.740173 57.792542 14.582161 114.391424 65.766858 813.601807 57.448738 14.162222