Summary Page Created:Tue June 12, 2007 09:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 700389

Instrument: ACIS Obs ID: 1031 Source: Mrk 231 PI: Prof. Gordon Garmire Title: OBSERVATION OF MKR 231

acisf01031N002 full img2.fits acisf01031N002 cntr img2.fits

Summary Page Created:Tue June 12, 2007 09:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 700389

Instrument: ACIS Obs ID: 1031 Source: Mrk 231 PI: Prof. Gordon Garmire Title: OBSERVATION OF MKR 231

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T13:20:41 Date and time of file creation DATE-OBS 2000-10-19T12:51:04 Observation start date DATE-END 2000-10-20T00:19:27 Observation end date RA PNT 194.07765211934 Pointing RA DEC PNT 56.873837998625 Pointing Dec ROLL PNT 11.229408884957 Pointing Roll RA TARG 194.059583 Observer’s specified target RA DEC TARG 56.873694 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T13:56:01 Date and time of file creation DATE-OBS 2000-10-19T12:51:04 Observation start date DATE-END 2000-10-20T00:19:27 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT Mrk 231 Source name TITLE OBSERVATION OF MKR 231 Proposal title OBSERVER Prof. Gordon Garmire Principal investigator OBS ID 1031 Observation id SEQ NUM 700389 Sequence number RA NOM 194.07765211934 Nominal RA DEC NOM 56.873837998625 Nominal Dec ROLL NOM 11.229408884957 Nominal Roll

Summary Page Created:Tue June 12, 2007 09:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 700389

Instrument: ACIS Obs ID: 1031 Source: Mrk 231 PI: Prof. Gordon Garmire Title: OBSERVATION OF MKR 231

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 194.059332 56.873617 1422.000000 41.151478 34.555260 194.605891 56.990483 1239.292358 68.812637 18.009661 193.736943 56.827777 543.125000 30.414558 17.857403 194.641617 56.873153 1046.820557 71.978600 14.543498 194.035712 56.812088 294.000000 20.857342 14.095756 194.129788 56.822536 262.386353 19.030209 13.787887 193.896314 56.877704 288.284088 22.007633 13.099277 193.762742 56.831547 282.193176 22.882944 12.332031 194.616645 56.964075 737.926880 73.081665 10.097292 194.021706 56.732371 159.625000 16.082846 9.925172