Summary Page Created:Thu November 23, 2006 00:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 700301

Instrument: ACIS Obs ID: 2111 Source: LBQS 1442-0011 PI: Prof. William Brandt Title: PUBLIC OBSERVATIONS OF A WELL-DEFINED SAMPLE OF BAL QSOS FROM THE LARGE

BRIGHT QUASAR SURVEY: REMOVING THE BARRIERS

acisf02111N002 full img2.fits acisf02111N002 cntr img2.fits

Summary Page Created:Thu November 23, 2006 00:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 700301

Instrument: ACIS Obs ID: 2111 Source: LBQS 1442-0011 PI: Prof. William Brandt Title: PUBLIC OBSERVATIONS OF A WELL-DEFINED SAMPLE OF BAL QSOS FROM THE LARGE

BRIGHT QUASAR SURVEY: REMOVING THE BARRIERS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-23T05:31:36 Date and time of file creation DATE-OBS 2001-05-30T05:27:09 Observation start date DATE-END 2001-05-30T07:05:47 Observation end date RA PNT 221.30406584309 Pointing RA DEC PNT -0.40561686508406 Pointing Dec ROLL PNT 228.12337026146 Pointing Roll RA TARG 221.311667 Observer’s specified target RA DEC TARG -0.399611 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-23T05:43:26 Date and time of file creation DATE-OBS 2001-05-30T05:27:09 Observation start date DATE-END 2001-05-30T07:05:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT LBQS 1442-0011 Source name TITLE PUBLIC OBSERVATIONS OF A WELL-DEFINED SAMPLE OF BAL QSOS FROM THE LARGE BRIGHT QUASAR SURVEY: RE- MOVING THE BARRIERS

Proposal title

OBSERVER Prof. William Brandt Principal investigator OBS ID 2111 Observation id SEQ NUM 700301 Sequence number RA NOM 221.30406584309 Nominal RA DEC NOM -0.40561686508406 Nominal Dec ROLL NOM 228.12337026146 Nominal Roll

Summary Page Created:Thu November 23, 2006 00:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 700301

Instrument: ACIS Obs ID: 2111 Source: LBQS 1442-0011 PI: Prof. William Brandt Title: PUBLIC OBSERVATIONS OF A WELL-DEFINED SAMPLE OF BAL QSOS FROM THE LARGE

BRIGHT QUASAR SURVEY: REMOVING THE BARRIERS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 221.311592 -0.422523 35.000000 7.379993 4.742552 221.147057 -0.673139 93.295685 20.916517 4.460383 221.056291 -0.595287 85.913620 21.015938 4.088022 221.223598 -0.455826 25.079546 6.531888 3.839556 221.250249 -0.548570 28.487499 7.846901 3.630414 221.064200 -0.580790 72.151787 20.396366 3.537483 221.089499 -0.626069 68.684387 20.748625 3.310310 221.193166 -0.626609 49.041668 15.630728 3.137516 221.228687 -0.590694 33.885715 11.211402 3.022433