Summary Page Created:Mon November 27, 2006 22:43 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800118

Instrument: ACIS Obs ID: 1650 Source: PKS1404-257 PI: Prof Andrew Fabian Title: THE COOLING FLOW IN PKS1404-267

acisf01650N002 full img2.fits acisf01650N002 cntr img2.fits

Summary Page Created:Mon November 27, 2006 22:43 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800118

Instrument: ACIS Obs ID: 1650 Source: PKS1404-257 PI: Prof Andrew Fabian Title: THE COOLING FLOW IN PKS1404-267

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-28T03:17:30 Date and time of file creation DATE-OBS 2001-06-07T21:40:33 Observation start date DATE-END 2001-06-08T00:04:05 Observation end date RA PNT 211.87062239642 Pointing RA DEC PNT -27.038733886645 Pointing Dec ROLL PNT 266.16368042844 Pointing Roll RA TARG 211.874108 Observer’s specified target RA DEC TARG -27.018083 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-28T03:42:14 Date and time of file creation DATE-OBS 2001-06-07T21:40:33 Observation start date DATE-END 2001-06-08T00:04:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-35678 Detector GRATING NONE Grating OBJECT PKS1404-257 Source name TITLE THE COOLING FLOW IN PKS1404-267

Proposal title

OBSERVER Prof Andrew Fabian Principal investigator OBS ID 1650 Observation id SEQ NUM 800118 Sequence number RA NOM 211.87062239642 Nominal RA DEC NOM -27.038733886645 Nominal Dec ROLL NOM 266.16368042844 Nominal Roll

Summary Page Created:Mon November 27, 2006 22:43 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800118

Instrument: ACIS Obs ID: 1650 Source: PKS1404-257 PI: Prof Andrew Fabian Title: THE COOLING FLOW IN PKS1404-267

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 211.874001 -27.017879 543.142883 26.567623 20.443787 211.815042 -27.158451 231.708328 18.602592 12.455702 211.815117 -27.158248 212.340912 18.238117 11.642699 211.782397 -27.339680 217.787369 26.643639 8.174086 211.638455 -26.942774 80.807846 12.141605 6.655450 211.636710 -26.943088 71.137253 12.616672 5.638353 211.919256 -27.346412 108.691032 22.456842 4.839996 211.781885 -27.289575 107.750000 22.781061 4.729806 211.720641 -26.940756 39.062069 8.970821 4.354347 211.893199 -27.345768 110.807312 26.266157 4.218634