Summary Page Created:Sat November 4, 2006 07:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800123

Instrument: ACIS Obs ID: 1655 Source: MACS J0717.5+3745 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 2

acisf01655N002 full img2.fits acisf01655N002 cntr img2.fits

Summary Page Created:Sat November 4, 2006 07:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800123

Instrument: ACIS Obs ID: 1655 Source: MACS J0717.5+3745 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 2

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-04T12:18:59 Date and time of file creation DATE-OBS 2001-01-29T07:46:32 Observation start date DATE-END 2001-01-29T13:59:37 Observation end date RA PNT 109.33409949741 Pointing RA DEC PNT 37.719828024893 Pointing Dec ROLL PNT 231.31024015542 Pointing Roll RA TARG 109.379167 Observer’s specified target RA DEC TARG 37.761 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-04T12:43:06 Date and time of file creation DATE-OBS 2001-01-29T07:46:32 Observation start date DATE-END 2001-01-29T13:59:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT MACS J0717.5+3745 Source name TITLE DETERMINATION OF H0 AND Q0, 2000 PART 2

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 1655 Observation id SEQ NUM 800123 Sequence number RA NOM 109.33409949741 Nominal RA DEC NOM 37.719828024893 Nominal Dec ROLL NOM 231.31024015542 Nominal Roll

Summary Page Created:Sat November 4, 2006 07:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800123

Instrument: ACIS Obs ID: 1655 Source: MACS J0717.5+3745 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 2

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 109.321626 37.708835 166.428574 14.439155 11.526199 109.477623 37.742615 155.055176 14.345511 10.808619 109.442850 37.724984 85.791664 11.155056 7.690833 109.403604 37.708402 68.238640 9.848695 6.928699 109.298756 37.681738 57.714287 9.226545 6.255243 109.290450 37.720006 60.142857 9.802948 6.135180 109.241143 37.659771 45.318180 8.568626 5.288850 109.255607 37.939587 64.294121 12.658032 5.079314 109.409380 37.780617 38.875000 8.135307 4.778553 109.165968 37.858778 50.875000 11.884369 4.280833