Summary Page Created:Tue June 12, 2007 11:49 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 800127

Instrument: ACIS Obs ID: 1659 Source: ZWCL 1953 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

acisf01659N002 full img2.fits acisf01659N002 cntr img2.fits

Summary Page Created:Tue June 12, 2007 11:49 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 800127

Instrument: ACIS Obs ID: 1659 Source: ZWCL 1953 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T15:25:20 Date and time of file creation DATE-OBS 2000-10-22T05:46:33 Observation start date DATE-END 2000-10-22T13:10:54 Observation end date RA PNT 132.54956827141 Pointing RA DEC PNT 36.123358815007 Pointing Dec ROLL PNT 71.971782485765 Pointing Roll RA TARG 132.52625 Observer’s specified target RA DEC TARG 36.072222 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.10 ASCDS version number DATE 2007-06-12T15:47:38 Date and time of file creation DATE-OBS 2000-10-22T05:46:33 Observation start date DATE-END 2000-10-22T13:10:54 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT ZWCL 1953 Source name TITLE DETERMINATION OF H0 AND Q0, 2000 PART 1

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 1659 Observation id SEQ NUM 800127 Sequence number RA NOM 132.54956827141 Nominal RA DEC NOM 36.123358815007 Nominal Dec ROLL NOM 71.971782485765 Nominal Roll

Summary Page Created:Tue June 12, 2007 11:49 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 800127

Instrument: ACIS Obs ID: 1659 Source: ZWCL 1953 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 132.558845 36.026640 391.034088 21.534092 18.158838 132.615219 36.178916 117.714287 13.354423 8.814630 132.625553 36.025287 115.110344 13.464225 8.549349 132.623862 36.093874 90.857140 11.581578 7.844971 132.454385 36.080615 73.750000 10.666286 6.914309 132.531236 36.033329 66.708336 10.420047 6.401922 132.298228 36.358067 146.946838 25.720720 5.713170 132.657280 36.162555 46.238636 8.494848 5.443139 132.499936 36.278628 59.360001 11.309720 5.248582 132.272336 36.297700 101.000000 21.650440 4.665032