Summary Page Created:Tue November 21, 2006 09:35 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800129

Instrument: ACIS Obs ID: 1661 Source: A1413 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

acisf01661N002 full img2.fits acisf01661N002 cntr img2.fits

Summary Page Created:Tue November 21, 2006 09:35 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800129

Instrument: ACIS Obs ID: 1661 Source: A1413 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-21T14:15:58 Date and time of file creation DATE-OBS 2001-05-16T09:33:58 Observation start date DATE-END 2001-05-16T12:46:50 Observation end date RA PNT 178.79103074287 Pointing RA DEC PNT 23.363988070368 Pointing Dec ROLL PNT 236.21189194655 Pointing Roll RA TARG 178.825833 Observer’s specified target RA DEC TARG 23.408 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-21T14:34:00 Date and time of file creation DATE-OBS 2001-05-16T09:33:58 Observation start date DATE-END 2001-05-16T12:46:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A1413 Source name TITLE DETERMINATION OF H0 AND Q0, 2000 PART 1

Proposal title

OBSERVER DR. LEON VANSPEYBROECK Principal investigator OBS ID 1661 Observation id SEQ NUM 800129 Sequence number RA NOM 178.79103074287 Nominal RA DEC NOM 23.363988070368 Nominal Dec ROLL NOM 236.21189194655 Nominal Roll

Summary Page Created:Tue November 21, 2006 09:35 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800129

Instrument: ACIS Obs ID: 1661 Source: A1413 PI: DR. LEON VANSPEYBROECK Title: DETERMINATION OF H0 AND Q0, 2000 PART 1

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 178.899499 23.456451 453.708344 24.075693 18.845079 178.694842 23.487872 100.667503 12.853427 7.831958 178.705522 23.349571 90.857140 12.638288 7.189039 178.850533 23.411939 77.571426 11.101707 6.987342 178.824062 23.471125 60.487499 9.905765 6.106293 178.767241 23.521613 63.872501 10.913396 5.852670 178.708096 23.323491 49.875000 8.875214 5.619583 178.647802 23.502811 40.458332 9.726279 4.159693 178.812969 23.400473 31.428572 7.695543 4.083996 178.697502 23.436977 30.590000 7.809974 3.916786