Summary Page Created:Wed November 15, 2006 19:44 EST page: 1 of 3

Chandra X-ray Center Seq Num: 800150

Instrument: ACIS Obs ID: 2211 Source: A644 PI: John Stocke Title: COOLING FLOWS WITHOUT CENTRAL RADIO SOURCES?

acisf02211N002 full img2.fits acisf02211N002 cntr img2.fits

Summary Page Created:Wed November 15, 2006 19:44 EST page: 2 of 3

Chandra X-ray Center Seq Num: 800150

Instrument: ACIS Obs ID: 2211 Source: A644 PI: John Stocke Title: COOLING FLOWS WITHOUT CENTRAL RADIO SOURCES?

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-15T23:51:02 Date and time of file creation DATE-OBS 2001-03-26T00:27:49 Observation start date DATE-END 2001-03-26T09:20:28 Observation end date RA PNT 124.32970867656 Pointing RA DEC PNT -7.542009887686 Pointing Dec ROLL PNT 272.00698709255 Pointing Roll RA TARG 124.355833 Observer’s specified target RA DEC TARG -7.511778 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-11-16T00:42:50 Date and time of file creation DATE-OBS 2001-03-26T00:27:49 Observation start date DATE-END 2001-03-26T09:20:28 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-01236 Detector GRATING NONE Grating OBJECT A644 Source name TITLE COOLING FLOWS WITHOUT CENTRAL RADIO SOURCES?

Proposal title

OBSERVER John Stocke Principal investigator OBS ID 2211 Observation id SEQ NUM 800150 Sequence number RA NOM 124.32970867656 Nominal RA DEC NOM -7.542009887686 Nominal Dec ROLL NOM 272.00698709255 Nominal Roll

Summary Page Created:Wed November 15, 2006 19:44 EST page: 3 of 3

Chandra X-ray Center Seq Num: 800150

Instrument: ACIS Obs ID: 2211 Source: A644 PI: John Stocke Title: COOLING FLOWS WITHOUT CENTRAL RADIO SOURCES?

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 124.385039 -7.522291 265.511353 18.535110 14.324780 124.414952 -7.552331 241.125000 18.221882 13.232718 124.438094 -7.598943 198.199997 17.321053 11.442722 124.601599 -7.571233 253.045456 24.661015 10.260950 124.413635 -7.612547 91.872498 12.249501 7.500101 124.264420 -7.578825 55.857143 9.755863 5.725495 124.257952 -7.605801 45.000000 7.951595 5.659242 124.298011 -7.411003 55.333332 10.906438 5.073456 124.234230 -7.533813 45.795456 9.337769 4.904325 124.310699 -7.440365 43.875000 9.335914 4.699594