Summary Page Created:Mon October 2, 2006 22:18 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200169

Instrument: ACIS Obs ID: 2561 Source: ROSS 154 PI: Dr. Bradford Wargelin Title: STELLAR WINDS FROM DME STARS

acisf02561N002 full img2.fits acisf02561N002 cntr img2.fits

Summary Page Created:Mon October 2, 2006 22:18 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200169

Instrument: ACIS Obs ID: 2561 Source: ROSS 154 PI: Dr. Bradford Wargelin Title: STELLAR WINDS FROM DME STARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-03T00:34:53 Date and time of file creation DATE-OBS 2002-09-08T23:44:46 Observation start date DATE-END 2002-09-09T16:56:07 Observation end date RA PNT 282.45535072113 Pointing RA DEC PNT -23.846053841649 Pointing Dec ROLL PNT 275.53711017468 Pointing Roll RA TARG 282.456208 Observer’s specified target RA DEC TARG -23.836389 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.2848053 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-03T02:17:39 Date and time of file creation DATE-OBS 2002-09-08T23:44:46 Observation start date DATE-END 2002-09-09T16:56:07 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-7 Detector GRATING NONE Grating OBJECT ROSS 154 Source name TITLE STELLAR WINDS FROM DME STARS

Proposal title

OBSERVER Dr. Bradford Wargelin Principal investigator OBS ID 2561 Observation id SEQ NUM 200169 Sequence number RA NOM 282.45535072113 Nominal RA DEC NOM -23.846053841649 Nominal Dec ROLL NOM 275.53711017468 Nominal Roll

Summary Page Created:Mon October 2, 2006 22:18 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200169

Instrument: ACIS Obs ID: 2561 Source: ROSS 154 PI: Dr. Bradford Wargelin Title: STELLAR WINDS FROM DME STARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 282.456070 -23.836433 42763.570312 235.779572 181.370972 282.450529 -23.836950 158.142853 20.371086 7.763104 282.443957 -23.837516 153.857147 20.338215 7.564928 282.442611 -23.828100 95.857140 12.853284 7.457794 282.461931 -23.835901 135.428574 20.251205 6.687432 282.446080 -23.837316 129.857147 19.699127 6.592025 282.465829 -23.835545 124.857140 18.975597 6.579880 282.452393 -23.836765 154.000000 23.610594 6.522496 282.446685 -23.837268 124.428574 19.385468 6.418652 282.448499 -23.837111 126.142860 20.085415 6.280321