Summary Page Created:Sun October 15, 2006 02:54 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 200171

Instrument: ACIS Obs ID: 2563 Source: L1527 PI: DR. PHILIPPE ANDRE’ Title: X-RAY EVOLUTION OF ACCRETING PROTOSTARS

acisf02563N003 full img2.fits acisf02563N003 cntr img2.fits

Summary Page Created:Sun October 15, 2006 02:54 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 200171

Instrument: ACIS Obs ID: 2563 Source: L1527 PI: DR. PHILIPPE ANDRE’ Title: X-RAY EVOLUTION OF ACCRETING PROTOSTARS

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-15T05:58:56 Date and time of file creation DATE-OBS 2002-12-06T08:30:12 Observation start date DATE-END 2002-12-06T14:21:15 Observation end date RA PNT 69.96971482741 Pointing RA DEC PNT 26.051262555888 Pointing Dec ROLL PNT 222.21081063095 Pointing Roll RA TARG 69.974583 Observer’s specified target RA DEC TARG 26.052778 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.9 ASCDS version number DATE 2006-10-15T06:53:29 Date and time of file creation DATE-OBS 2002-12-06T08:30:12 Observation start date DATE-END 2002-12-06T14:21:15 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT L1527 Source name TITLE X-RAY EVOLUTION OF AC- CRETING PROTOSTARS

Proposal title

OBSERVER DR. PHILIPPE ANDRE Principal investigator OBS ID 2563 Observation id SEQ NUM 200171 Sequence number RA NOM 69.96971482741 Nominal RA DEC NOM 26.051262555888 Nominal Dec ROLL NOM 222.21081063095 Nominal Roll

Summary Page Created:Sun October 15, 2006 02:54 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 200171

Instrument: ACIS Obs ID: 2563 Source: L1527 PI: DR. PHILIPPE ANDRE’ Title: X-RAY EVOLUTION OF ACCRETING PROTOSTARS

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 70.033388 26.090435 200.857147 16.689404 12.035010 70.282713 25.893789 352.410248 40.652462 8.668854 70.253674 25.867707 241.903656 48.121983 5.026885 70.238952 25.854823 226.627914 45.792084 4.949063 69.967525 26.121968 40.428570 8.346276 4.843905 70.268427 25.880644 222.674423 47.988026 4.640208 69.937083 26.031319 37.428570 8.136259 4.600219 69.947933 26.027987 33.714287 7.591296 4.441177 70.202627 25.828468 214.993362 48.432110 4.439066 70.262735 25.912513 177.956253 40.916538 4.349250